- 1 -

Copyright © Massachusetts Institute of Technology 1996. All rights reserved.

0:001:00

MLIIMLII

V5V5(N•A•

1:002:00

V5V5•

2:003:00

3:004:00

V5V5•A•A•

4:005:00

V5V5•A•

5:006:00

6:007:00

7:008:00

8:009:00

9:0010:00

10:0011:00

11:0012:00

12:0013:00

13:0014:00

14:0015:00

V5V5•A•A•A•A•A•01DROCERPRINTED18AUGUST196

2.5 mm/sec, 1 mm/mV