- 1 -

Copyright © Massachusetts Institute of Technology 1996. All rights reserved.

0:100:16

MLIIMLII

V5V5•

0:160:22

0:220:28

V5V5•01DROCERPRINTED18AUGUST196

25 mm/sec, 10 mm/mV