2025303540

Diastolic PAP (mmHg)

40 60 80 100

Mean ABP (mmHg)

0

10

20

30

Elapsed time (hours)

0102030

Elapsed time (hours)

40 60 80 100 120

20 25 30 35 40

Diastolic PAP (mmHg)