CPU Prices (April 2001) 05001000

1500 Clock speed (MHz)

0 100 200 300 400

Price (US $)

Duron

Athlon (200 MHz FSB)

Athlon (266 MHz FSB)

Celeron

Pentium III

Pentium 4

2000 Clock speed (normalized by family for FP performance)

0 100 200 300 400 500