0.850.900.951.00 Fraction Available Data

0.9

1.0

1.1

Estimate/True LO Power

5% Conf. Limits

25% Conf. Limits

0.9

1.0

1.1

Estimate/True HI Power

Confidence Limits for Spline Power Estimates