                 WAVE: Waveform Analyzer, Viewer, and Editor

	                       George B. Moody
                    Massachusetts Institute of Technology

	WAVE version 6.11 was installed Fri Mar 11 12:37:40 EST 2011

-------------------------------------------------------------------------------
WAVE: Waveform analyzer, viewer, and editor
Copyright (C) 1990-2010 George B. Moody

This program is free software; you can redistribute it and/or modify it under
the terms of the GNU General Public License as published by the Free Software
Foundation; either version 2 of the License, or (at your option) any later
version.

This program is distributed in the hope that it will be useful, but WITHOUT ANY
WARRANTY; without even the implied warranty of MERCHANTABILITY or FITNESS FOR A
PARTICULAR PURPOSE.  See the GNU General Public License for more details.

You should have received a copy of the GNU General Public License along with
this program; if not, write to the Free Software Foundation, Inc., 59 Temple
Place - Suite 330, Boston, MA 02111-1307, USA.

You may contact the author by e-mail (george@mit.edu) or postal mail
(MIT Room E25-505A, Cambridge, MA 02139 USA).  If you are submitting a bug
report, please include your name and address, and the version number and date
shown above.  Thanks!

For updates to this software, please visit PhysioNet
(http://www.physionet.org/).

_______________________________________________________________________________

For a copy of this document, print `/usr/help/wave/news.hlp' (or click
`Print' at the top of the window if you are viewing this from within WAVE).
For a copy of the on-line help for WAVE, print `/usr/help/wave/wave.hlp'.

For a copy of the WAVE User's Guide (a tutorial introduction and reference
manual for WAVE), use your web browser to open /usr/help/html/wug/wug.htm
(or http://www.physionet.org/physiotools/wug/wug.htm), or print
/usr/help/html/wug/wug.ps on a PostScript printer.

Summary of changes since version 6.0:

- Resize signals by selecting them and using <ctrl>-<+> or <ctrl>-<->
- Change time scale using <ctrl>-<(> and <ctrl>-<)>
- Search for the next valid sample of a specified signal
- XView full-screen pointer grab disabled for compatibility with recent X
  servers
- View option to display valid signals only
- More reliable operation on X servers that don't implement backing store
- Updated hardware recommendations
- Ports to Mac OS X and MS-Windows with Cygwin
- Wider range of time scales
